(rad) ϕΔ -3 -2 -1 0 1 2 3

)^{-1}

(rad e-h)φΔ/dN (d_eN1/

1 1.5 2 2.5 3 3.5 4_{(a) MB Trigger Sample} c < 2.5 GeV/ e Tp 1.5 < c > 0.3 GeV/ h Tp | < 0.9 η| /NDF = 19/18 2χ

= 2.76 TeV s ALICE pp,

(rad) φΔ -3 -2 -1 0 1 2 3 1 2 3 4 5 6 7 8 e→Data: c,b MC fit e → MC: c ) e → (c → MC: b

(b) EMCal Trigger Sample c < 6.0 GeV/ e Tp 4.5 < c > 0.3 GeV/ h Tp | < 0.7 η| /NDF = 8.5 / 9 2χ